\setpartpreamble{%
  \vspace*{20pt}%
  Part IV summarizes the work done during this thesis' project, draws conclusions from it's learnings, and  gives recommendations for future endeavors in induction hardening simulation.
}
\part{Conclusion}
\label{part:conclusion}
